An. Şt. Univ. Ovidius Constanţa Vol. 14(1), 2006, 109–109

Autor’s ERRATUM at the paper: On Rothe’s fixed point theorem in a general topological vector space, published by G. Isac in: An. Şt.

Univ. Ovidius Constanţa, Ser. Mat., vol 12(2004), f2, 127-134

G. Isac

Abstract

In my paper “On Rothe’s fixed point theorem in a general topological vector space”, published in the volume dedicated to Prof. D. Pascali, I used Cauty’s Theorem published as a solution to the famous Schauder’s conjecture. (See Fundamenta math., 170 (2001), 231-246). Cauty’s proof is an abstract because the complete proof is long and based on many technical results known in homological algebra. Personally, I did not have access to this proof. In 2005, a specialist in fixed-point theory remarked that a detail in Cauty’s proof is not clear. In this case, my paper must be considered in the following sense: if Cauty’s Theorem is correct, the Rothe’s fixed point theorem is true in any Hausdorff general topological vector space.

Department of Mathematics, Royal Military College of Canada, P.O. Box 17000, Stn Forces, Kingston, Ontario, Canada K7K 7B4